                                                                 1, 000

                                                              10, 000

                                                          100, 000

                                                    1, 000,000

                                                 10, 000, 000

                                             100, 000, 000

                                       1, 000,000,000

                                                                                1965 1970 1975 1980 1985 1990 1995 2000 2005 2010

Intel x86 Family

DEC Alpha Family

SIA Predictions

Year

Number of Transistors on a Die

8086

Pentium Pro

27,500 x 8086 or

(189 x 8086)

145 x Pentium Pro

SIA - Semiconductor Industry Association

                                                                                                          Processor VLSI Technology Trends

                                                                                                          Processor VLSI Technology Trends

                                                                 1, 000

                                                              10, 000

                                                          100, 000

                                                    1, 000,000

                                                 10, 000, 000

                                             100, 000, 000

                                       1, 000,000,000

                                                                                1965 1970 1975 1980 1985 1990 1995 2000 2005 2010

Intel x86 Family

DEC Alpha Family

SIA Predictions

Year

Number of Transistors on a Die

8086

Pentium II

27,586 x 8086 or

(258 x 8086)

107 x Pentium II

SIA - Semiconductor Industry Association